Because of our location several different firehous...

Because of our location several different firehouses could respond.While one of my brothers was a volunteer firefighter for many years in Yorktown, Indiana, I not sure of who would respond here. In fact when our renters a long while back had an electrical fire, several responded. No one hurt and my DH had it out before they got here. We live in Madison, Indiana and the volenteers here do a great job.